Power [10log10(m**2/sec**4/Hz)] [dB]

2025 Jun 13 11:20:21 BK BKS 00 HHN PSD PDF

BK BKS 00 HHN

92 PSDs : 2025:152 - 2025:155 Hz 10

0.1

1

1

0.1

10

0.01

100