-80-60-40-2020406080

Up (mm)

94.4 94.6 94.8 95.0 95.2 95.4 95.6 95.8 96.0 96.2 96.4 Year

-40-30-20-1010203040

East (mm)

-40-30-20-1010203040

North (mm)