A: 12/22 11:24 AM First ShakeMap with ML 6.4.

B: 12/22 11:38 Update with additional stations and Mw 6.5

C:12/22 15:33 Update with addition of finite fault description. D: 12/22 18:34 Update with data from the Templeton station.

E: 12/23 16:28 Update with data from the Cambria station. F: ShakeMap as of 1/5/2004.