0 2 4 6

98 100 102 104

Epicentral distance (deg)

0 -0.2 ± 0.4

1.0 ± 0.6 CCM -4 -2 0 2 4

SVd-SHd (s)

98 100 102 104 106

0 0.0 ± 0.4

1.4 ± 0.4

RSON

0 2 4 6

114 116 118 120 0 0.0 ± 0.4 1.6 ± 0.4 HRV