10 12

114 116 118 120 122

HRV

SKS 6

8

10

114 116 118 120 122

HRV

SKKS 4 8 12 16

108 112 116 120 124

HRV shallow

SKS

2 4 6 8 10

Residual (s)

100 102 104 106

RSON

SKS 2 4 6

100 102 104 106

RSON

SKKS 0 4 8 12

96 102 108 114 0

RSON shallow

SKS

4 6 8 10

98 100 102 104

CCM

SKS 2 4 6 8

98 100 102 104

Epicentral distance (deg)

CCM

SKKS 0 4 8 12

92 94 96 98 100 102 104 0

CCM shallow

SKS

0.64 ± 0.13

0.16 ± 0.20

0.61 ± 0.08

0.03 ± 0.10

1.2 ± 0.14

0.36 ± 0.13

1.8 ± 0.55

-0.28 ± 0.17

0.82 ± 0.28

-1.10 ± 0.67

1.1 ± 0.09

0.53 ± 0.12

2.4 ± 1.1 2.7 ± 1.3

-1.2 ± 0.15

1.7 ± 0.20

0.14 ± 0.10

-0.54 ± 0.30