NUVEL1A-NNR reference frame. 1σ (realistic) error ellipses.

Goddard Space Flight Center VLBI solution KB 2007dn version 01

Pacific

KAUAI KOKEE

KWAJAL26

MARCUS

MK-VLBA

DIFFERENCE VECTORS & 1σ ERRORS

KAUAI 7.5 +/- 0.5 mm/yr at 292 deg KOKEE 6.7 +/- 0.4 mm/yr at 287 deg KWAJAL26 9.7 +/- 1.6 mm/yr at 262 deg MARCUS 7.3 +/- 2.5 mm/yr at 312 deg MK-VLBA 7.2 +/- 0.4 mm/yr at 286 deg

COLOR KEY

Pacific velocity Difference from rigid Pacific plate VLBI velocity

SCALE

ten mm/yr

pending_placement