A A’

   0
  410
  660

   1700

     CMB

B B’ C C’

    0
    410
   660

  1700

CMB

D D’

   0
  410
  660

   1700

      CMB

E E’ F F’

     0
    410
    660

  1700

CMB

(-0.9%) slow fast (+0.9%)

A

B

C D

E

F

A’ B’ C’

D’ E’

F’