1 10 100 1000

-200

-180

-160

-140

-120

-100

Period (sec)

PSD (10*log(m/s 2)2/Hz)

143

1 10 100 1000

-200

-180

-160

-140

-120

-100 -80

Period (sec)

350350

MOBB.Z FARB.Z SAO.Z YBH.Z