Figure 1: Location of the MOBB site (yellow star) with respect to nearby broadband stations of the Berkeley Digital Seismic Network (blue squares). The site of the temporary MOISE deployment (MOIS, yellow square), in summer of 1997 is also indicated. The background seismicity is from the CNSS catalog and covers the time period 1950-2002.