-6 -4 -2 0 2 4 6 x 10^{-4}

Amplitude (m/s)

Unfiltered FROB.DP1

Surface wave

-5

0

5 x 10^{-8}

25-40 Hz

Time (s)

Frequency (Hz) a. 100 150 200 250 300 350 400 450 0

10

20

30

40

50

60

-1

-0.5

0

0.5

1 x 10^{-3}

Unfiltered PKD.HHZ

Surface wave

-1 -0.5 0 0.5 1 x 10^{-7}

15-30 Hz

Time (s) b. 150 200 250 300 350 400 450 0 5 10 15 20 25 30 35 40

-60 -55 -50 -45 -40 -35 -30 -25 -20