\documentclass{report}
\usepackage{array}
\usepackage{epsfig}
\usepackage{fancybox}
\begin{document}
\title{\begin{center}
	\epsfig{file=ncedc.ps, height = 70pt}
	\newline\newline\newline\newline\newline
	\shadowbox{\bf{Hardware Tracking Schema v1.1}}
	\newline\newline\newline\newline\newline\newline\newline
	\epsfig{file=seismo.ps, height = 70pt}
	\end{center}
       }
\author{Zuzlewski St\'ephane}
\date{March 1998}

\maketitle
\tableofcontents


\chapter{Inventory}


\section{Response information}


\subsection{Response information}

$$Response (seqresp\_id, resp\_number)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	seqresp\_id & int & Sequence of responses identifier\\
\hline	resp\_number & int & Response number\\
\hline	resp\_type & char(1) & Response type (H, L, P, Z, F)\\
\hline	resp\_id & int & Response identifier\\
\hline
\end{tabular}
\end{center}

\subsection{High-pass filter}

$$Response\_HP (hp\_id, order)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	hp\_id & int & Filter identifier\\
\hline	filter\_type & char(2) & Filter type (BW, DG, ND)\\
\hline	nb\_pole & int & Number of poles\\
\hline	corner\_freq & float & Corner frequency of filter\\
\hline	damping\_value & float & Fraction of critical damping\\
\hline
\end{tabular}
\end{center}

\subsection{Low-pass filter}

$$Response\_LP (lp\_id, order)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	lp\_id & int & Filter identifier\\
\hline	filter\_type & char(2) & Filter type (BW, DG, ND)\\
\hline	nb\_pole & int & Number of poles\\
\hline	corner\_freq & float & Corner frequency of filter\\
\hline	damping\_value & float & Fraction of critical damping\\
\hline
\end{tabular}
\end{center}

\newpage
\subsection{Poles and Zeros}

$$Response\_PZ (pz\_id, pz\_number, type)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	pz\_id & int & Poles and Zeros identifier\\
\hline	pz\_number & int & Pole/Zero number\\
\hline	type & char(1) & Pole or Zero\\
\hline	r\_value & float & Real zero/pole\\
\hline	r\_error & float & Real zero/pole error\\
\hline	i\_value & float & Imaginary zero/pole\\
\hline	i\_error & float & Imaginary zero/pole error\\
\hline
\end{tabular}
\end{center}

\subsection{Polynomial}

$$Response\_PN (pn\_id)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	pn\_id & int & Polynom identifier\\
\hline	poly\_type & char(1) & Type of polynomial approximation (C, L, M)\\
\hline	lower\_bound & float & Polynomial lower bound\\
\hline	upper\_bound & float & Polynomial upper bound\\
\hline	max\_error & float & Maximum error of polynomial approximation\\
\hline	nb\_coeff & int & Number of polynomial coefficients\\
\hline
\end{tabular}
\end{center}

$$Response\_PN\_Data (pn\_id, pn\_number)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	pn\_id & int & Polynom identifier\\
\hline	pn\_number & int & Coefficient number\\
\hline	pn\_value & float & Coefficient value\\
\hline
\end{tabular}
\end{center}

\newpage
\section{Sensor information}


\subsection{Sensor information}

$$Sensor (sensor\_id, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	sensor\_id & int & Sensor identifier\\
\hline	name & char(80) & Sensor name\\
\hline	serial\_nb & char(80) & Sensor serial number\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline	nb\_component & int & Number of components\\
\hline
\end{tabular}
\end{center}

\subsection{Component information}

$$Sensor\_Component (sensor\_id, comp\_nb)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	sensor\_id & int & Sensor identifier\\
\hline	comp\_nb & int & Component number\\
\hline	channel & char(1) & Channel\\
\hline	type & char(1) & Type\\
\hline	sensitivity & float & Sensitivity\\
\hline	frequency & float & Frequency\\
\hline	seqresp\_id & int & Sequence of responses identifier\\
\hline
\end{tabular}
\end{center}

\newpage
\section{Filter-amplifier information}


\subsection{Filter-amplifier information}

$$Filamp (filamp\_id, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	filamp\_id & int & Filter-amplifier identifier\\
\hline	name & char(80) & Filter-amplifier name\\
\hline	serial\_nb & char(80) & Filter-amplifier serial number\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline	nb\_pchannel & int & Number of physical channels\\
\hline
\end{tabular}
\end{center}

\subsection{Physical channel information}

$$Filamp\_PChannel (filamp\_id, pchannel\_nb)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	filamp\_id & int & Filter-amplifier identifier\\
\hline	pchannel\_nb & int & Physical channel number\\
\hline	gain & float & Gain\\
\hline	seqresp\_id & int & Sequence of responses identifier\\
\hline
\end{tabular}
\end{center}

\newpage
\section{Datalogger information}


\subsection{Datalogger information}

$$Datalogger (data\_id, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	data\_id & int & Datalogger identifier\\
\hline	data\_type & char(80) & Datalogger type\\
\hline	serial\_nb & char(80) & Datalogger serial number\\
\hline	firmware\_nb & char(80) & Datalogger firmware number\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline	nb\_board & int	 & Number of boards\\
\hline
\end{tabular}
\end{center}

\subsection{Board information}

$$Datalogger\_Board (data\_id, board\_nb, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	data\_id & int & Datalogger identifier\\
\hline	board\_nb & int & Board number\\
\hline	serial\_nb & char(80) & Board serial number\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline	nb\_module & int & Number of modules\\
\hline
\end{tabular}
\end{center}

\subsection{Module information}

$$Datalogger\_Module (data\_id, board\_nb, module\_nb, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	data\_id & int & Datalogger identifier\\
\hline	board\_nb & int & Board number\\
\hline	module\_nb & int & Module number\\
\hline	serial\_nb & char(80) & Module serial number\\
\hline	sensitivity & float & Sensitivity (counts/volt)\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline
\end{tabular}
\end{center}

\newpage
\section{Filter information}


\subsection{FIR Filter information}

$$Filter\_FIR (fir\_id)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	fir\_id & int & FIR filter identifier\\
\hline	name & char(80) & Filter name\\
\hline	symmetry & char(1) & Filter symmetry (Even/None/Odd)\\
\hline
\end{tabular}
\end{center}
	
$$Filter\_FIR\_Data (fir\_id, coeff\_number)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	fir\_id	 & int & FIR filter identifier\\
\hline	coeff\_number & int & Numerator/Denominator number\\
\hline	type & char(1) & Numerator or Denominator\\
\hline	coeff & float & Numerator/Denominator coefficient\\
\hline	error & float & Numerator/Denominator error\\
\hline
\end{tabular}
\end{center}


\subsection{Filter information}

$$Filter (filter\_id)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	filter\_id & int & Filter identifier\\
\hline	gain & float & Filter gain\\
\hline	freq & float & Frequency for filter gain\\
\hline	in\_sp\_rate & float & Input sample rate\\
\hline	out\_sp\_rate & float & Output sample rate\\
\hline	sample & int & Sample selected during decimation\\
\hline	delay & float & Filter delay\\
\hline	timetag & float & Delay applied to timetag\\
\hline	seqresp\_id & int & Sequence of responses identifier\\
\hline
\end{tabular}
\end{center}

\newpage
\subsection{Filters sequence}
		
$$Filter\_Sequence (seqfil\_id)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	seqfil\_id & int & Sequence identifier\\
\hline	nb\_filter & int & Number of filters\\
\hline	overall\_gain & float & Overall gain\\
\hline	freq & float & Frequency\\
\hline
\end{tabular}
\end{center}

$$Filter\_Sequence\_Data (seqfil\_id, filter\_nb)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	seqfil\_id & int & Sequence identifier\\
\hline	filter\_nb & int & Filter number\\
\hline	filter\_id & int & Filter identifier\\
\hline
\end{tabular}
\end{center}
	
	
	
\chapter{Tracking}

\section{Station information}

$$Station (sta, net, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	sta & char(6) & Station call letters\\
\hline	net & char(8) & Network code\\
\hline	lat & float & Latitude\\
\hline	lon & float & Longitude\\
\hline	elevation & float & Elevation\\
\hline	name & char(80) & Station name\\
\hline	nb\_sensor & int & Number of sensors\\
\hline	nb\_filamp & int & Number of filter-amplifiers\\
\hline	nb\_digi & int & Number of digitizers\\
\hline	nb\_data & int & Number of dataloggers\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline
\end{tabular}
\end{center}

\newpage
\section{Sensor information}

\subsection{Sensor information}

$$Station\_Sensor (sta, net, sensor\_nb, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	sta & char(6) & Station call letters\\
\hline	net & char(8) & Network code\\
\hline	sensor\_nb & int & Sensor number\\
\hline	sensor\_id & int & Sensor identifier\\
\hline	lat & float & Latitude\\
\hline	lon & float & Longitude\\
\hline	elevation & float & Elevation\\
\hline	depth & float & Local depth\\
\hline	nb\_component & int & Number of components\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline
\end{tabular}
\end{center}

\subsection{Sensor/Component information}

$$Station\_Sensor\_Component (sta, net, sensor\_nb, component\_nb, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	sta & char(6) & Station call letters\\
\hline	net & char(8) & Network code\\
\hline	sensor\_nb & int & Sensor number\\
\hline	component\_nb & int & Component number\\
\hline	hardware\_type & char(1) & Hardware type (Filter-amplifier, Digitizer)\\
\hline	hardware\_nb & int & Hardware number\\
\hline	hardware\_pchannel & int & Hardware physical channel\\
\hline	azimuth & float & Azimuth\\
\hline	dip & float & Dip\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline
\end{tabular}
\end{center}

\newpage
\section{Filter-amplifier information}

\subsection{Filter-amplifier information}

$$Station\_Filamp (sta, net, filamp\_nb, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	sta & char(6) & Station call letters\\
\hline	net & char(8) & Network code\\
\hline	filamp\_nb & int & Filter-amplifier number\\
\hline	filamp\_id & int & Filter-amplifier identifier\\
\hline	nb\_pchannel & int & Number of physical channels\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline
\end{tabular}
\end{center}

\subsection{Filter-amplifier/Physical channel information}
$$Station\_Filamp\_PChannel (sta, net, filamp\_nb, pchannel\_nb, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	sta & char(6) & Station call letters\\
\hline	net & char(8) & Network code\\
\hline	filamp\_nb & int & Filter-amplifier number\\
\hline	pchannel\_nb & int & Physical channel number\\
\hline	hardware\_type & char(1) & Hardware type (Filter-amplifier, Digitizer)\\
\hline	hardware\_nb & int & Hardware number\\
\hline	hardware\_pchannel & int & Hardware physical channel\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline
\end{tabular}
\end{center}

\newpage
\section{Digitizer information}

\subsection{Digitizer information}

$$Station\_Digitizer (sta, net, digi\_nb, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	sta & char(6) & Station call letters\\
\hline	net & char(8) & Network code\\
\hline	digi\_nb & int & Digitizer number\\
\hline	serial\_nb & char(80) & Digitizer serial number\\
\hline	nb\_pri\_pchannel & int & Number of primary physical channels\\
\hline	nb\_aux\_pchannel & int & Number of auxiliary physical channels\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline
\end{tabular}
\end{center}

\subsection{Digitizer/Physical channel information}

$$Station\_Digitizer\_PChannel (sta, net, digi\_nb, pchannel\_nb, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	sta & char(6) & Station call letters\\
\hline	net & char(8) & Network code\\
\hline	digi\_nb & int & Digitizer number\\
\hline	pchannel\_nb & int & Physical channel number\\
\hline	data\_nb & int & Datalogger number\\
\hline	data\_pchannel & int & Datalogger physical channel\\
\hline	digi\_type & char(3) & Digitizer type (DSP, AUX)\\
\hline	digi\_polarity & char(1) & Digitizer polarity (N, ...)\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline
\end{tabular}
\end{center}

\newpage
\section{Datalogger information}

\subsection{Datalogger information}

$$Station\_Datalogger (sta, net, data\_nb, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	sta & char(6) & Station call letters\\
\hline	net & char(8) & Network code\\
\hline	data\_nb & int & Datalogger number\\
\hline	data\_id & int & Datalogger identifier\\
\hline	nb\_pchannel & int & Number of physical channels\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline
\end{tabular}
\end{center}

\subsection{Datalogger/Physical channel information}

$$Station\_Datalogger\_PChannel (sta, net, data\_nb, pchannel\_nb, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	sta & char(6) & Station call letters\\
\hline	net & char(8) & Network code\\
\hline	data\_nb & int & Datalogger number\\
\hline	pchannel\_nb & int & Physical channel number\\
\hline	seed\_io & char(2) & SEED instrument and orientation\\
\hline	nb\_lchannel & int & Number of logical channels\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline
\end{tabular}
\end{center}

\newpage
\subsection{Datalogger/Logical channel information}

$$Station\_Datalogger\_LChannel (sta, net, data\_nb, pchannel\_nb, lchannel\_nb, start\_date)$$
\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	sta & char(6) & Station call letters\\
\hline	net & char(8) & Network code\\
\hline	data\_nb & int & Datalogger number\\
\hline	pchannel\_nb & int & Physical channel number\\
\hline	lchannel\_nb & int & Logical channel number\\
\hline	seqfil\_id & int & Sequence of filters identifier\\
\hline	seed & char(3) & SEED channel name\\
\hline	location & char(2) & SEED location\\
\hline	rgain & float & Gain at the response frequency\\
\hline	rfreq & float & Frequency for response\\
\hline	sample\_rate & float & Sample rate\\
\hline	clock\_tolerance & float & Clock tolerance\\
\hline	data\_type & char(2) & Data type (TG/CG)\\
\hline	data\_format & char(80) & Data format (SEED, ...)\\
\hline	comp\_type & char(80) & Compression type (STEIM1, ...)\\
\hline	block\_size & int & Block size (512, 4096, ...)\\
\hline	start\_date & date & Start date\\
\hline	end\_date & date & End date\\
\hline
\end{tabular}
\end{center}

\chapter{Example: YBIB}

\section{Overview}

\epsfig{file=ybibv1.1.ps, angle=-90}

\newpage
\section{Inventory}

\subsection{Response}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	seqresp\_id & resp\_number & resp\_type & resp\_id\\
\hline	1 & 1 & H & 1\\
\hline	2 & 1 & H & 2\\
\hline	3 & 1 & L & 1\\
\hline	4 & 1 & F & 1\\
\hline	5 & 1 & F & 2\\
\hline
\end{tabular}
\end{center}

\subsection{Response\_HP}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	hp\_id & filter\_type & nb\_pole & corner\_freq & damping\_value\\
\hline	1 & DG & 2 & 4.5 & 0.62\\
\hline	2 & DG & 1 & 0.0796 & 1.\\
\hline
\end{tabular}
\end{center}

\subsection{Response\_LP}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	lp\_id & filter\_type & nb\_pole & corner\_freq & damping\_value\\
\hline	1 & DG & 2 & 600. & 0.7071\\
\hline
\end{tabular}
\end{center}

\subsection{Sensor}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	sensor\_id & name & serial\_nb & start\_date & end\_date & nb\_component\\
\hline	1 & WIL 13 & YBIB1 & 1996/06/28 23:25 & NULL & 4\\
\hline
\end{tabular}
\end{center}

\subsection{Sensor\_Component}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	sensor\_id & comp\_nb & channel & type & sensitivity & frequency & seqresp\_id\\
\hline	1 & 1 & 1 & A & 1.0204 & 10. & 3\\
\hline	1 & 2 & 2 & A & 1.0204 & 10. & 3\\
\hline	1 & 3 & 3 & A & 1.0204 & 10. & 3\\
\hline	1 & 4 & 4 & V & 50. & 30. & 1\\
\hline
\end{tabular}
\end{center}

\newpage
\subsection{Filamp}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	filamp\_id & name & serial\_nb & start\_date & end\_date & nb\_pchannel\\
\hline	1 & Qpreamp & 94sd05 & 1996/06/28 23:25 & NULL & 4\\
\hline
\end{tabular}
\end{center}

\subsection{Filamp\_PChannel}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	filamp\_id & pchannel\_nb & gain & seqresp\_id\\
\hline	1 & 1 & 10. & 2\\
\hline	1 & 2 & 10. & 2\\
\hline	1 & 3 & 10. & 2\\
\hline	1 & 4 & 100. & NULL\\
\hline
\end{tabular}
\end{center}

\subsection{Datalogger}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	data\_id & data\_type & serial\_nb & firmware\_nb & start\_date & end\_date & nb\_board\\
\hline	1 & Q4120 & 941004 & 0 & 1996/06/06 00:00 & NULL & 1\\
\hline
\end{tabular}
\end{center}

\subsection{Datalogger\_Board}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	data\_id & board\_nb & serial\_nb & start\_date & end\_date & nb\_module\\
\hline	1 & 1 & 941004A & 1996/06/06 00:00 & NULL & 4\\
\hline
\end{tabular}
\end{center}

\subsection{Datalogger\_Module}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	data\_id & board\_nb & module\_nb & serial\_nb & sensitivity & start\_date & end\_date\\
\hline	1 & 1 & 1 & NULL & 428638. & NULL & NULL\\
\hline	1 & 1 & 2 & NULL & 431261. & NULL & NULL\\
\hline	1 & 1 & 3 & NULL & 425793. & NULL & NULL\\
\hline	1 & 1 & 4 & NULL & 413133. & NULL & NULL\\
\hline
\end{tabular}
\end{center}

\newpage
\subsection{Filter\_Sequence}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	seqfil\_id & nb\_filter & overall\_gain & freq\\
\hline	1 & 3 & 0. & 0.\\
\hline	2 & 4 & 0. & 0.\\
\hline	3 & 5 & 0. & 0.\\
\hline	4 & 7 & 0. & 0.\\
\hline
\end{tabular}
\end{center}

\subsection{Filter\_Sequence\_Data}

Only the first sequence of filters is described.

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c |}
\hline	seqfil\_id & order & filter\_id\\
\hline	1 & 1 & 1\\
\hline	1 & 2 & 2\\
\hline	1 & 3 & 3\\
\hline
\end{tabular}
\end{center}

\subsection{Filter}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c}
\hline	filter\_id & gain & freq & in\_sp\_rate & out\_sp\_rate\\
\hline	1 & 1. & 0. & 32000. & 2000.\\
\hline	2 & 1. & 0. & 2000. & 1000.\\
\hline	3 & 1. & 0. & 1000. & 500.\\
\hline
\end{tabular}
\end{center}

\begin{center}
\begin{tabular}{>{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	sample & delay & timetag & seqresp\_id\\
\hline	0 & 0. & 0. & 4\\
\hline	0 & 0. & 0. & 5\\
\hline	0 & 0. & 0. & 5\\
\hline
\end{tabular}
\end{center}

\subsection{Filter\_FIR}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	fir\_id & name & symmetry & gain\\
\hline	1 & FIR.AD32M & N & 0.999904\\
\hline	2 & FIR.F96CM & N & 0.999188\\
\hline
\end{tabular}
\end{center}

\subsection{Filter\_FIR\_Data}

This table is not described, due to the high amount of rows.

\newpage
\section{Tracking}

\subsection{Station}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c}
\hline	sta & net & lat & lon & elevation & name\\
\hline	YBIB & BK & 37.81472 & -122.35815 & 4. & Yerba Buena Island\\
\hline
\end{tabular}
\end{center}

\begin{center}
\begin{tabular}{>{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	nb\_sensor & nb\_filamp & nb\_digi & nb\_data & start\_date & end\_date\\
\hline	1 & 1 & 1 & 1 & 1996/06/28 23:25 & NULL\\
\hline
\end{tabular}
\end{center}

\subsection{Station\_Sensor}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c}
\hline	sta & net & sensor\_nb & sensor\_id & lat & lon\\
\hline	YBIB & BK & 1 & 1 & 37.81472 & -122.35815\\
\hline
\end{tabular}
\end{center}

\begin{center}
\begin{tabular}{>{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	elevation & depth & nb\_component & start\_date & end\_date\\
\hline	4. & 61. & 4 & 1996/06/28 23:25 & NULL\\
\hline
\end{tabular}
\end{center}

\subsection{Station\_Sensor\_Component}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c}
\hline	sta & net & sensor\_nb & component\_nb & hardware\_type & hardware\_nb\\
\hline	YBIB & BK & 1 & 1 & F & 1\\
\hline	YBIB & BK & 1 & 2 & F & 1\\
\hline	YBIB & BK & 1 & 3 & F & 1\\
\hline	YBIB & BK & 1 & 4 & F & 1\\
\hline
\end{tabular}
\end{center}

\begin{center}
\begin{tabular}{>{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	hardware\_pchannel & azimuth & dip & start\_date & end\_date\\
\hline	1 & 0. & -90. & 1996/06/28 23:25 & NULL\\
\hline	2 & 257. & 0. & 1996/06/28 23:25 & NULL\\
\hline	3 & 347. & 0. & 1996/06/28 23:25 & NULL\\
\hline	4 & 0. & -90. & 1996/06/28 23:25 & NULL\\
\hline
\end{tabular}
\end{center}

\newpage
\subsection{Station\_Filamp}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	sta & net & filamp\_nb & filamp\_id & nb\_pchannel & start\_date & end\_date\\
\hline	YBIB & BK & 1 & 1 & 4 & 1996/06/28 23:25 & NULL\\
\hline
\end{tabular}
\end{center}

\subsection{Station\_Filamp\_PChannel}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c}
\hline	sta & net & filamp\_nb & pchannel\_nb & hardware\_type\\
\hline	YBIB & BK & 1 & 1 & D\\
\hline	YBIB & BK & 1 & 2 & D\\
\hline	YBIB & BK & 1 & 3 & D\\
\hline	YBIB & BK & 1 & 4 & D\\
\hline
\end{tabular}
\end{center}

\begin{center}
\begin{tabular}{>{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	hardware\_nb & hardware\_pchannel & start\_date & end\_date\\
\hline	1 & 4 & 1996/06/28 23:25 & NULL\\
\hline	1 & 3 & 1996/06/28 23:25 & NULL\\
\hline	1 & 2 & 1996/06/28 23:25 & NULL\\
\hline	1 & 1 & 1996/06/28 23:25 & NULL\\
\hline
\end{tabular}
\end{center}

\subsection{Station\_Digitizer}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c}
\hline	sta & net & digi\_nb & serial\_nb\\
\hline	YBIB & BK & 1 & 941004A\\
\hline
\end{tabular}
\end{center}

\begin{center}
\begin{tabular}{>{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	nb\_pri\_pchannel & nb\_aux\_pchannel & start\_date & end\_date\\
\hline	4 & 0 & 1996/06/28 23:25 & NULL\\
\hline
\end{tabular}
\end{center}

\subsection{Station\_Digitizer\_PChannel}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c}
\hline	sta & net & digi\_nb & pchannel\_nb & data\_nb\\
\hline	YBIB & BK & 1 & 1 & 1\\
\hline	YBIB & BK & 1 & 2 & 1\\
\hline	YBIB & BK & 1 & 3 & 1\\
\hline	YBIB & BK & 1 & 4 & 1\\
\hline
\end{tabular}
\end{center}

\begin{center}
\begin{tabular}{>{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	data\_pchannel & digi\_type & digi\_polarity & start\_date & end\_date\\
\hline	1 & DSP & N & 1996/06/28 23:25 & NULL\\
\hline	2 & DSP & N & 1996/06/28 23:25 & NULL\\
\hline	3 & DSP & N & 1996/06/28 23:25 & NULL\\
\hline	4 & DSP & N & 1996/06/28 23:25 & NULL\\
\hline
\end{tabular}
\end{center}

\newpage
\subsection{Station\_Datalogger}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	sta & net & data\_nb & data\_id & nb\_pchannel & start\_date & end\_date\\
\hline	YBIB & BK & 1 & 1 & 4 & 1996/06/28 23:25 & NULL\\
\hline
\end{tabular}
\end{center}

\subsection{Station\_Datalogger\_PChannel}

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c}
\hline	sta & net & data\_nb & pchannel\_nb\\
\hline	YBIB & BK & 1 & 1\\
\hline	YBIB & BK & 1 & 2\\
\hline	YBIB & BK & 1 & 3\\
\hline	YBIB & BK & 1 & 4\\
\hline
\end{tabular}
\end{center}

\begin{center}
\begin{tabular}{>{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	seed\_io & nb\_lchannel & start\_date & end\_date\\
\hline	L1 & 4 & 1996/06/28 23:25 & NULL\\
\hline	L2 & 4 & 1996/06/28 23:25 & NULL\\
\hline	L3 & 4 & 1996/06/28 23:25 & NULL\\
\hline	P1 & 4 & 1996/06/28 23:25 & NULL\\
\hline
\end{tabular}
\end{center}

\newpage
\subsection{Station\_Datalogger\_LChannel}

The start\_date, end\_date, location, rgain and rfreq fields are not described.

\begin{center}
\begin{tabular}{| >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c}
\hline	sta & net & data\_nb & pchannel\_nb & lchannel\_nb & seqfil\_id & seed & sample\_rate\\
\hline	YBIB & BK & 1 & 1 & 1 & 1 & CL1 & 500\\
\hline	YBIB & BK & 1 & 1 & 2 & 2 & HL1 & 100\\
\hline	YBIB & BK & 1 & 1 & 3 & 3 & BL1 & 20\\
\hline	YBIB & BK & 1 & 1 & 4 & 4 & LL1 & 1\\
\hline	YBIB & BK & 1 & 2 & 1 & 1 & CL2 & 500\\
\hline	YBIB & BK & 1 & 2 & 2 & 2 & HL2 & 100\\
\hline	YBIB & BK & 1 & 2 & 3 & 3 & BL2 & 20\\
\hline	YBIB & BK & 1 & 2 & 4 & 4 & LL2 & 1\\
\hline	YBIB & BK & 1 & 3 & 1 & 1 & CL3 & 500\\
\hline	YBIB & BK & 1 & 3 & 2 & 2 & HL3 & 100\\
\hline	YBIB & BK & 1 & 3 & 3 & 3 & BL3 & 20\\
\hline	YBIB & BK & 1 & 3 & 4 & 4 & LL3 & 1\\
\hline	YBIB & BK & 1 & 4 & 1 & 1 & DP1 & 500\\
\hline	YBIB & BK & 1 & 4 & 2 & 2 & EP1 & 100\\
\hline	YBIB & BK & 1 & 4 & 3 & 3 & BP1 & 20\\
\hline	YBIB & BK & 1 & 4 & 4 & 4 & LP1 & 1\\
\hline
\end{tabular}
\end{center}

\begin{center}
\begin{tabular}{>{\large}c | >{\large}c | >{\large}c | >{\large}c | >{\large}c |}
\hline	clock\_tolerance & data\_type & data\_format & comp\_type & block\_size\\
\hline	5. d-2 & TG & SEED & STEIM2 & 4096\\
\hline	1. d-2 & TG & SEED & STEIM2 & 4096\\
\hline	2. d-3 & TG & SEED & STEIM2 & 4096\\
\hline	1. d-4 & TG & SEED & STEIM2 & 4096\\
\hline	5. d-2 & TG & SEED & STEIM2 & 4096\\
\hline	1. d-2 & TG & SEED & STEIM2 & 4096\\
\hline	2. d-3 & TG & SEED & STEIM2 & 4096\\
\hline	1. d-4 & TG & SEED & STEIM2 & 4096\\
\hline	5. d-2 & TG & SEED & STEIM2 & 4096\\
\hline	1. d-2 & TG & SEED & STEIM2 & 4096\\
\hline	2. d-3 & TG & SEED & STEIM2 & 4096\\
\hline	1. d-4 & TG & SEED & STEIM2 & 4096\\
\hline	5. d-2 & TG & SEED & STEIM2 & 4096\\
\hline	1. d-2 & TG & SEED & STEIM2 & 4096\\
\hline	2. d-3 & TG & SEED & STEIM2 & 4096\\
\hline	1. d-4 & TG & SEED & STEIM2 & 4096\\

\hline
\end{tabular}
\end{center}








\end{document}
